\documentclass[11pt]{article}
 \usepackage[margin=.2in]{geometry}
 \usepackage{longtable}
 \usepackage[usenames]{color}

\pagestyle{empty}

\setlength{\parskip}{\medskipamount}

% \nofiles % Uncomment this line if there are no cross references.

\begin{document}

\noindent
 \tiny
 \input{\jobname.body}

\end{document}
