\documentclass[]{article} % inchmargs,headsup
\usepackage{inchmargs,headsup,splat,hyperref}

\setlength{\parskip}{\medskipamount}

% \nofiles % Uncomment this line if there are no cross references.

\begin{document}

\inputnospell{bibmacs}

\nocite{*}

\bibliographystyle{plain}
\bibliography{sources}

\end{document}
