\documentclass[12pt]{article}
 \usepackage{inchmargs, headsup}

\setlength{\parskip}{\medskipamount}

\input{genmacs}
\input{vtxmacs}

\setcounter{divisions}{4}

\nofiles % Uncomment this line if there are no cross references.

\begin{document}

Metal:\metal(5,5)

Polyvert:\polyvert(5,5)

Diffvert:\diffvert(5,5)

Diffhor:\diffhor(5,5)

\end{document}
