\documentclass[12pt]{article}
 % \usepackage{inchmargs, headsup, feetdown}
 \usepackage[margin=1in]{geometry}

\pagestyle{empty}

\setlength{\parskip}{\medskipamount}

 \nofiles % Uncomment this line if there are no cross references.

\begin{document}

This is just a file full of a bunch of densely packed (and repetitive)
text that should just fill one page of a 12pt document with the
standard 1 inch margins, no header, and no footer.  The purpose is to
check that paper size is being figured correctly and so forth so that
the margins come out right.
This is just a file full of a bunch of densely packed (and repetitive)
text that should just fill one page of a 12pt document with the
standard 1 inch margins, no header, and no footer.  The purpose is to
check that paper size is being figured correctly and so forth so that
the margins come out right.
This is just a file full of a bunch of densely packed (and repetitive)
text that should just fill one page of a 12pt document with the
standard 1 inch margins, no header, and no footer.  The purpose is to
check that paper size is being figured correctly and so forth so that
the margins come out right.
This is just a file full of a bunch of densely packed (and repetitive)
text that should just fill one page of a 12pt document with the
standard 1 inch margins, no header, and no footer.  The purpose is to
check that paper size is being figured correctly and so forth so that
the margins come out right.
This is just a file full of a bunch of densely packed (and repetitive)
text that should just fill one page of a 12pt document with the
standard 1 inch margins, no header, and no footer.  The purpose is to
check that paper size is being figured correctly and so forth so that
the margins come out right.
This is just a file full of a bunch of densely packed (and repetitive)
text that should just fill one page of a 12pt document with the
standard 1 inch margins, no header, and no footer.  The purpose is to
check that paper size is being figured correctly and so forth so that
the margins come out right.
This is just a file full of a bunch of densely packed (and repetitive)
text that should just fill one page of a 12pt document with the
standard 1 inch margins, no header, and no footer.  The purpose is to
check that paper size is being figured correctly and so forth so that
the margins come out right.
This is just a file full of a bunch of densely packed (and repetitive)
text that should just fill one page of a 12pt document with the
standard 1 inch margins, no header, and no footer.  The purpose is to
check that paper size is being figured correctly and so forth so that
the margins come out right.
This is just a file full of a bunch of densely packed (and repetitive)
text that should just fill one page of a 12pt document with the
standard 1 inch margins, no header, and no footer.  The purpose is to
check that paper size is being figured correctly and so forth so that
the margins come out right.
This is just a file full of a bunch of densely packed (and repetitive)
text that should just fill one page of a 12pt document with the
standard 1 inch margins, no header, and no footer.  The purpose is to
check that paper size is being figured correctly and so forth so that
the margins come out right.
This is just a file full of a bunch of densely packed (and repetitive)
text that should just fill one page of a 12pt document with the
standard 1 inch margins, no header, and no footer.  The purpose is to
check that paper size is being figured correctly and so forth so that
the margins come out right.
This is just a file full of a bunch of densely packed (and repetitive)
text that should just fill one page of a 12pt document with the
standard 1 inch margins, no header, and no footer.  The purpose is to
check that paper size is being figured correctly and so forth so that
the margins come out right.
This is just a file full of a bunch of densely packed (and repetitive)
text that should just fill one page of a 12pt document with the
standard 1 inch margins, no header, and no footer.  The purpose is to
check that paper size is being figured correctly and so forth so that
the margins come out right.
This is just a file full of a bunch of densely packed (and repetitive)
text that should just fill one page of a 12pt document with the
standard 1 inch margins, no header, and no footer.  The purpose is to
check that paper size, etc. is right........

\end{document}
