%  MACROS FOR CORRECTING A MANUSCRIPT WITH STANDARD PROOFREADING MARKS
%  WHILE LEAVING THE ORIGINAL MANUSCRIPT CONTENTS EXACTLY WHERE THEY WERE

\newlength{\margparvadj}
\setlength{\margparvadj}{0ex}

\newlength{\caratdrop}
\setlength{\caratdrop}{2.3ex}
\newlength{\caratwidth}
\setlength{\caratwidth}{2.2ex}

\newcommand{\pfrins}[1]{\pfrinsmark\pfrinstext{#1}}

\newcommand{\pfrinsmark}{\raisebox{-\caratdrop}[0in][0in]{\makebox[0in]{$\widehat{\hspace*{\caratwidth}}$}}}
\newcommand{\pfrinstext}[1]{\marginpar{\vspace*{-\caratdrop}\vspace*{\margparvadj}\em Correction: Insert: #1}}
